









        P.C. PLANETARIUM will now copy itself onto your hard disk.


        For your information:

             The current directory will have a batch file named
        "sky.bat".  A subdirectory of the current directory will
        be made named "\sky".  P.C. PLANETARIUM will be copied 
        into this subdirectory.

             P.C. PLANETARIUM and the IBM DOS files it requires
        will occupy about 328K of disk space.

